\section{regparam\_\-pyramid Struct Reference}
\label{structregparam__pyramid}\index{regparam_pyramid@{regparam\_\-pyramid}}
A collection of settings for registering images at various resolutions.  


\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
const size\_\-t {\bf nlevels}\label{structregparam__pyramid_o0}

\begin{CompactList}\small\item\em the total number of resolution levels \item\end{CompactList}\item 
const uint32\_\-t {\bf ratio}\label{structregparam__pyramid_o1}

\begin{CompactList}\small\item\em resolution ratio between levels in the pyramid \item\end{CompactList}\item 
const {\bf regparamp\_\-t} {\bf plevel}\label{structregparam__pyramid_o2}

\begin{CompactList}\small\item\em array of level search parameters \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
A collection of settings for registering images at various resolutions. 

The parameters in {\tt plevel}[0] are for the highest resolution, those in {\tt plevel}[nlevels-1] for the lowest. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
{\bf find\_\-register.c}\end{CompactItemize}
