\section{overlap Struct Reference}
\label{structoverlap}\index{overlap@{overlap}}
Represents the overlap interval between two images.  


\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
uint32\_\-t {\bf soff}\label{structoverlap_o0}

\begin{CompactList}\small\item\em coordinate offset in the first image \item\end{CompactList}\item 
uint32\_\-t {\bf toff}\label{structoverlap_o1}

\begin{CompactList}\small\item\em coordinate offset in the second image \item\end{CompactList}\item 
uint32\_\-t {\bf len}\label{structoverlap_o2}

\begin{CompactList}\small\item\em length of the interval in both images \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Represents the overlap interval between two images. 

The interval is on a single image dimension (pixels, lines, etc.); an offset from the image origin and a length (less than the image size in that dimension) are the basis of this representation. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
{\bf find\_\-register.c}\end{CompactItemize}
