\section{mpos Struct Reference}
\label{structmpos}\index{mpos@{mpos}}
The goodness of fit metric value from matching images, with their positions.  


\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
double {\bf t}\label{structmpos_o0}

\begin{CompactList}\small\item\em goodness of fit value at a particular position \item\end{CompactList}\item 
{\bf Xydisplace\_\-t} {\bf pos}\label{structmpos_o1}

\begin{CompactList}\small\item\em the relative position \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
The goodness of fit metric value from matching images, with their positions. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
{\bf find\_\-register.c}\end{CompactItemize}
