\section{mheap Struct Reference}
\label{structmheap}\index{mheap@{mheap}}
A fixed-size ordered queue (a heap structure) of goodness of fit values.  


\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
size\_\-t {\bf n\_\-max}\label{structmheap_o0}

\begin{CompactList}\small\item\em maximum number of entries in the queue \item\end{CompactList}\item 
size\_\-t {\bf n}\label{structmheap_o1}

\begin{CompactList}\small\item\em current number of entries in the queue \item\end{CompactList}\item 
{\bf mposp\_\-t} {\bf q}\label{structmheap_o2}

\begin{CompactList}\small\item\em array representation of a complete binary tree (heap) \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
A fixed-size ordered queue (a heap structure) of goodness of fit values. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
{\bf find\_\-register.c}\end{CompactItemize}
