\section{bytedisk2img.c File Reference}
\label{bytedisk2img_8c}\index{bytedisk2img.c@{bytedisk2img.c}}
Reading single-byte images from external SADIE files. 

{\tt \#include $<$sadie.h$>$}\par
{\tt \#include \char`\"{}sadie\_\-byte.h\char`\"{}}\par
\subsection*{Defines}
\begin{CompactItemize}
\item 
\#define {\bf NEEDSWAP}\ 1\label{bytedisk2img_8c_a0}

\end{CompactItemize}


\subsection{Detailed Description}
Reading single-byte images from external SADIE files. 

The DISK2IMG function in libsadie can read external data in SADIE format with the value of each pixel encoded in a single byte, but it cannot handle the similar internal representation, the {\bf IMAGE\_\-BYTE}{\rm (p.\,\pageref{structIMAGE__BYTE})} structure, so something more specialized is needed.

\begin{Desc}
\item[Author:]University of Arizona Digital Image Analysis Lab \end{Desc}
\begin{Desc}
\item[Date:]2004 \end{Desc}
\begin{Desc}
\item[Version:]\begin{Desc}
\item[Id]{\bf bytedisk2img.c}{\rm (p.\,\pageref{bytedisk2img_8c})},v 1.4 2004/08/06 22:47:11 mmunro Exp \end{Desc}
\end{Desc}
