1600 1605 1610 1615 1620 1625 1630 1635 1640 1645 1650 1655 1660 1665 1670 1675 1680 1685 1690 1695 1700

-1

-0.5

0

mckenna_pk_standard_rw.txt(1690-1979)

1700 1705 1710 1715 1720 1725 1730 1735 1740 1745 1750 1755 1760 1765 1770 1775 1780 1785 1790 1795 1800

-1

-0.5

0

mckenna_pk_standard_rw.txt(1690-1979)

1800 1805 1810 1815 1820 1825 1830 1835 1840 1845 1850 1855 1860 1865 1870 1875 1880 1885 1890 1895 1900

-1

-0.5

0

mckenna_pk_standard_rw.txt(1690-1979)

1900 1905 1910 1915 1920 1925 1930 1935 1940 1945 1950 1955 1960 1965 1970 1975 1980 1985 1990 1995 2000

-1

-0.5

mckenna_pk_standard_rw.txt(1690-1979)