\section{vstretch.c File Reference}
\label{vstretch_8c}\index{vstretch.c@{vstretch.c}}
{\tt \#include \char`\"{}sadie.h\char`\"{}}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
void {\bf VSTRETCH} ({\bf IMAGE} $\ast$in, short size, {\bf IMAGE} $\ast$$\ast${\bf out})
\end{CompactItemize}


\subsection{Function Documentation}
\index{vstretch.c@{vstretch.c}!VSTRETCH@{VSTRETCH}}
\index{VSTRETCH@{VSTRETCH}!vstretch.c@{vstretch.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}void VSTRETCH ({\bf IMAGE} $\ast$ {\em in}, short {\em size}, {\bf IMAGE} $\ast$$\ast$ {\em out})}\label{vstretch_8c_a0}




Definition at line 20 of file vstretch.c.

References CHECKIMG, IMAGE::data, GETMEM, IMAGE::gmax, IMAGE::gmin, malloc, max, MESSAGE, min, IMAGE::nbnd, IMAGE::nlin, IMAGE::npix, out, PROGRESS, SLEN, T\_\-EXIT, T\_\-VSTRETCH, IMAGE::text, TIMING, and y.

Referenced by Sadie\_\-Contrast\_\-Adapt\-Stretch\-Cmd.