\section{bpp\_\-switches  Struct Reference}
\label{structbpp__switches}\index{bpp_switches@{bpp\_\-switches}}
{\tt \#include $<$bppio.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
int32\_\-t {\bf xend}
\item 
int32\_\-t {\bf yend}
\end{CompactItemize}


\subsection{Field Documentation}
\index{bpp_switches@{bpp\_\-switches}!xend@{xend}}
\index{xend@{xend}!bpp_switches@{bpp\_\-switches}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}int32\_\-t bpp\_\-switches::xend}\label{structbpp__switches_m0}




Definition at line 14 of file bppio.h.\index{bpp_switches@{bpp\_\-switches}!yend@{yend}}
\index{yend@{yend}!bpp_switches@{bpp\_\-switches}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}int32\_\-t bpp\_\-switches::yend}\label{structbpp__switches_m1}




Definition at line 15 of file bppio.h.

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
{\bf bppio.h}\end{CompactItemize}
