\section{setmean.c File Reference}
\label{setmean_8c}\index{setmean.c@{setmean.c}}
{\tt \#include \char`\"{}sadie.h\char`\"{}}\par
{\tt \#include \char`\"{}proto.h\char`\"{}}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
void {\bf SETMEAN} ({\bf IMAGE} $\ast$in, {\bf PIXEL} mean, {\bf IMAGE} $\ast$$\ast${\bf out})
\end{CompactItemize}
\subsection*{Variables}
\begin{CompactItemize}
\item 
{\bf PIXEL} {\bf gain}
\item 
{\bf PIXEL} {\bf bias}
\end{CompactItemize}


\subsection{Function Documentation}
\index{setmean.c@{setmean.c}!SETMEAN@{SETMEAN}}
\index{SETMEAN@{SETMEAN}!setmean.c@{setmean.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}void SETMEAN ({\bf IMAGE} $\ast$ {\em in}, {\bf PIXEL} {\em mean}, {\bf IMAGE} $\ast$$\ast$ {\em out})}\label{setmean_8c_a2}




Definition at line 17 of file setmean.c.

References bias, CHECKIMG, IMAGE::data, gain, MESSAGE, IMAGE::nbnd, IMAGE::nlin, IMAGE::npix, out, SLEN, STRETCH, T\_\-EXIT, T\_\-RGBTOHSV, IMAGE::text, and TIMING.

Referenced by Sadie\_\-Proto\_\-Set\-Mean\-Cmd.

\subsection{Variable Documentation}
\index{setmean.c@{setmean.c}!bias@{bias}}
\index{bias@{bias}!setmean.c@{setmean.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}{\bf PIXEL} bias}\label{setmean_8c_a1}




Definition at line 6 of file setmean.c.

Referenced by SETMEAN.\index{setmean.c@{setmean.c}!gain@{gain}}
\index{gain@{gain}!setmean.c@{setmean.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}{\bf PIXEL} gain}\label{setmean_8c_a0}




Definition at line 5 of file setmean.c.

Referenced by SETMEAN.