\section{scatter.c File Reference}
\label{scatter_8c}\index{scatter.c@{scatter.c}}
{\tt \#include \char`\"{}sadie.h\char`\"{}}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
void {\bf SCATTER} ({\bf IMAGE} $\ast$in1, {\bf IMAGE} $\ast$in2, short bnd1, short bnd2, short inc, short {\bf nlev}, {\bf IMAGE} $\ast$$\ast${\bf out})
\end{CompactItemize}


\subsection{Function Documentation}
\index{scatter.c@{scatter.c}!SCATTER@{SCATTER}}
\index{SCATTER@{SCATTER}!scatter.c@{scatter.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}void SCATTER ({\bf IMAGE} $\ast$ {\em in1}, {\bf IMAGE} $\ast$ {\em in2}, short {\em bnd1}, short {\em bnd2}, short {\em inc}, short {\em nlev}, {\bf IMAGE} $\ast$$\ast$ {\em out})}\label{scatter_8c_a0}




Definition at line 16 of file scatter.c.

References CHECKIMG, IMAGE::data, GETMEM, IMAGE::gmax, IMAGE::gmin, max, MESSAGE, min, IMAGE::nbnd, IMAGE::nlin, IMAGE::npix, out, PROGRESS, RANGE, SLEN, T\_\-EXIT, T\_\-SCATTER, IMAGE::text, and TIMING.

Referenced by Sadie\_\-Tools\_\-Scatter\-Cmd.