\section{resampl.c File Reference}
\label{resampl_8c}\index{resampl.c@{resampl.c}}
{\tt \#include \char`\"{}sadie.h\char`\"{}}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
void {\bf RESAMPL} ({\bf IMAGE} $\ast$in, short jsize, short ksize, short jinc, short kinc, {\bf IMAGE} $\ast$$\ast${\bf out})
\end{CompactItemize}


\subsection{Function Documentation}
\index{resampl.c@{resampl.c}!RESAMPL@{RESAMPL}}
\index{RESAMPL@{RESAMPL}!resampl.c@{resampl.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}void RESAMPL ({\bf IMAGE} $\ast$ {\em in}, short {\em jsize}, short {\em ksize}, short {\em jinc}, short {\em kinc}, {\bf IMAGE} $\ast$$\ast$ {\em out})}\label{resampl_8c_a0}




Definition at line 13 of file resampl.c.

References CHECKIMG, IMAGE::data, GETMEM, MESSAGE, IMAGE::nbnd, IMAGE::nlin, IMAGE::npix, out, SLEN, T\_\-EXIT, T\_\-RESAMPL, IMAGE::text, and TIMING.