\section{periodogram.c File Reference}
\label{periodogram_8c}\index{periodogram.c@{periodogram.c}}
{\tt \#include \char`\"{}sadie.h\char`\"{}}\par
{\tt \#include \char`\"{}proto.h\char`\"{}}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
void {\bf PERIODOGRAM} ({\bf IMAGE} $\ast$in, {\bf IMAGE} $\ast$$\ast${\bf out})
\end{CompactItemize}


\subsection{Function Documentation}
\index{periodogram.c@{periodogram.c}!PERIODOGRAM@{PERIODOGRAM}}
\index{PERIODOGRAM@{PERIODOGRAM}!periodogram.c@{periodogram.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}void PERIODOGRAM ({\bf IMAGE} $\ast$ {\em in}, {\bf IMAGE} $\ast$$\ast$ {\em out})}\label{periodogram_8c_a0}




Definition at line 14 of file periodogram.c.

References CHECKIMG, IMAGE::data, GETMEM, MESSAGE, IMAGE::nbnd, IMAGE::nlin, IMAGE::npix, out, PSPECT, RELMEM, rnd, SLEN, T\_\-EXIT, IMAGE::text, and TIMING.