\section{nonmaxsuprx.c File Reference}
\label{nonmaxsuprx_8c}\index{nonmaxsuprx.c@{nonmaxsuprx.c}}
{\tt \#include \char`\"{}sadie.h\char`\"{}}\par
{\tt \#include \char`\"{}proto.h\char`\"{}}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
void {\bf NONMAXSUPRX} ({\bf IMAGE} $\ast$in, {\bf IMAGE} $\ast$$\ast${\bf out})
\end{CompactItemize}


\subsection{Function Documentation}
\index{nonmaxsuprx.c@{nonmaxsuprx.c}!NONMAXSUPRX@{NONMAXSUPRX}}
\index{NONMAXSUPRX@{NONMAXSUPRX}!nonmaxsuprx.c@{nonmaxsuprx.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}void NONMAXSUPRX ({\bf IMAGE} $\ast$ {\em in}, {\bf IMAGE} $\ast$$\ast$ {\em out})}\label{nonmaxsuprx_8c_a0}




Definition at line 11 of file nonmaxsuprx.c.

References CHECKIMG, IMAGE::data, GETMEM, MESSAGE, IMAGE::nbnd, IMAGE::nlin, IMAGE::npix, out, and SLEN.