\section{img2epsf.c File Reference}
\label{img2epsf_8c}\index{img2epsf.c@{img2epsf.c}}
{\tt \#include \char`\"{}sadie.h\char`\"{}}\par
{\tt \#include $<$stdio.h$>$}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
void {\bf IMG2EPSF} ({\bf IMAGE} $\ast$in, char $\ast${\bf name}, short nbit)
\end{CompactItemize}


\subsection{Function Documentation}
\index{img2epsf.c@{img2epsf.c}!IMG2EPSF@{IMG2EPSF}}
\index{IMG2EPSF@{IMG2EPSF}!img2epsf.c@{img2epsf.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}void IMG2EPSF ({\bf IMAGE} $\ast$ {\em in}, char $\ast$ {\em name}, short {\em nbit})}\label{img2epsf_8c_a0}




Definition at line 14 of file img2epsf.c.

References CHECKIMG, IMAGE::data, IMAGE::gmax, IMAGE::gmin, malloc, max, MESSAGE, IMAGE::nbnd, IMAGE::nlin, IMAGE::npix, rnd, SLEN, T\_\-EXIT, T\_\-IMG2EPSF, IMAGE::text, and TIMING.