\section{hsvtorgb.c File Reference}
\label{hsvtorgb_8c}\index{hsvtorgb.c@{hsvtorgb.c}}
{\tt \#include \char`\"{}sadie.h\char`\"{}}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
void {\bf HSVTORGB} ({\bf IMAGE} $\ast$in, {\bf IMAGE} $\ast$$\ast${\bf out})
\end{CompactItemize}


\subsection{Function Documentation}
\index{hsvtorgb.c@{hsvtorgb.c}!HSVTORGB@{HSVTORGB}}
\index{HSVTORGB@{HSVTORGB}!hsvtorgb.c@{hsvtorgb.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}void HSVTORGB ({\bf IMAGE} $\ast$ {\em in}, {\bf IMAGE} $\ast$$\ast$ {\em out})}\label{hsvtorgb_8c_a0}




Definition at line 20 of file hsvtorgb.c.

References CHECKIMG, IMAGE::data, GETMEM, IMAGE::gmax, IMAGE::gmin, MESSAGE, IMAGE::nbnd, IMAGE::nlin, IMAGE::npix, out, PROGRESS, RANGE, SLEN, SMAX, T\_\-EXIT, T\_\-HSVTORGB, IMAGE::text, and TIMING.