\section{hough.c File Reference}
\label{hough_8c}\index{hough.c@{hough.c}}
{\tt \#include \char`\"{}sadie.h\char`\"{}}\par
{\tt \#include \char`\"{}proto.h\char`\"{}}\par
\subsection*{Defines}
\begin{CompactItemize}
\item 
\#define {\bf FALSE}\ 0
\item 
\#define {\bf TRUE}\ 1
\end{CompactItemize}
\subsection*{Functions}
\begin{CompactItemize}
\item 
void {\bf HOUGH} ({\bf IMAGE} $\ast$in, int threshold, int rhobins, int thetabins, {\bf IMAGE} $\ast$$\ast$param, {\bf IMAGE} $\ast$$\ast${\bf out})
\end{CompactItemize}
\subsection*{Variables}
\begin{CompactItemize}
\item 
int $\ast$$\ast$ {\bf x\_\-array\_\-buffer}
\item 
int {\bf point}
\item 
int {\bf count\_\-point}
\end{CompactItemize}


\subsection{Define Documentation}
\index{hough.c@{hough.c}!FALSE@{FALSE}}
\index{FALSE@{FALSE}!hough.c@{hough.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}\#define FALSE\ 0}\label{hough_8c_a0}




Definition at line 6 of file hough.c.

Referenced by HOUGH.\index{hough.c@{hough.c}!TRUE@{TRUE}}
\index{TRUE@{TRUE}!hough.c@{hough.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}\#define TRUE\ 1}\label{hough_8c_a1}




Definition at line 7 of file hough.c.

Referenced by HOUGH.

\subsection{Function Documentation}
\index{hough.c@{hough.c}!HOUGH@{HOUGH}}
\index{HOUGH@{HOUGH}!hough.c@{hough.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}void HOUGH ({\bf IMAGE} $\ast$ {\em in}, int {\em threshold}, int {\em rhobins}, int {\em thetabins}, {\bf IMAGE} $\ast$$\ast$ {\em param}, {\bf IMAGE} $\ast$$\ast$ {\em out})}\label{hough_8c_a5}




Definition at line 24 of file hough.c.

References brshnm, CHECKIMG, count\_\-point, IMAGE::data, FALSE, GETMEM, IMAGE::gmin, malloc, MESSAGE, IMAGE::nbnd, IMAGE::nlin, IMAGE::npix, out, point, RANGE, rnd, SLEN, IMAGE::text, TRUE, and x\_\-array\_\-buffer.

\subsection{Variable Documentation}
\index{hough.c@{hough.c}!count_point@{count\_\-point}}
\index{count_point@{count\_\-point}!hough.c@{hough.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}int count\_\-point}\label{hough_8c_a4}




Definition at line 12 of file hough.c.

Referenced by HOUGH.\index{hough.c@{hough.c}!point@{point}}
\index{point@{point}!hough.c@{hough.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}int point}\label{hough_8c_a3}




Definition at line 11 of file hough.c.

Referenced by HOUGH.\index{hough.c@{hough.c}!x_array_buffer@{x\_\-array\_\-buffer}}
\index{x_array_buffer@{x\_\-array\_\-buffer}!hough.c@{hough.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}int$\ast$$\ast$ x\_\-array\_\-buffer}\label{hough_8c_a2}




Definition at line 10 of file hough.c.

Referenced by HOUGH.