\section{histeq.c File Reference}
\label{histeq_8c}\index{histeq.c@{histeq.c}}
{\tt \#include \char`\"{}sadie.h\char`\"{}}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
void {\bf HISTEQ} ({\bf IMAGE} $\ast$in, short {\bf nlev}, short inc, {\bf IMAGE} $\ast$$\ast${\bf out})
\end{CompactItemize}


\subsection{Function Documentation}
\index{histeq.c@{histeq.c}!HISTEQ@{HISTEQ}}
\index{HISTEQ@{HISTEQ}!histeq.c@{histeq.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}void HISTEQ ({\bf IMAGE} $\ast$ {\em in}, short {\em nlev}, short {\em inc}, {\bf IMAGE} $\ast$$\ast$ {\em out})}\label{histeq_8c_a0}




Definition at line 12 of file histeq.c.

References CHECKIMG, IMAGE::data, GETMEM, IMAGE::gmax, IMAGE::gmin, HISTOGRM, malloc, MESSAGE, IMAGE::nbnd, IMAGE::nlin, IMAGE::npix, out, RANGE, SLEN, T\_\-EXIT, T\_\-HISTEQ, IMAGE::text, and TIMING.