\section{findbestfocus.c File Reference}
\label{findbestfocus_8c}\index{findbestfocus.c@{findbestfocus.c}}
{\tt \#include \char`\"{}sadie.h\char`\"{}}\par
{\tt \#include \char`\"{}proto.h\char`\"{}}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
void {\bf FINDBESTFOCUS} ({\bf IMAGE} $\ast$$\ast$in, int nimg, int $\ast$bestfocus)
\end{CompactItemize}


\subsection{Function Documentation}
\index{findbestfocus.c@{findbestfocus.c}!FINDBESTFOCUS@{FINDBESTFOCUS}}
\index{FINDBESTFOCUS@{FINDBESTFOCUS}!findbestfocus.c@{findbestfocus.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}void FINDBESTFOCUS ({\bf IMAGE} $\ast$$\ast$ {\em in}, int {\em nimg}, int $\ast$ {\em bestfocus})}\label{findbestfocus_8c_a0}




Definition at line 13 of file findbestfocus.c.

References CHECKIMG, IMAGE::data, malloc, MESSAGE, IMAGE::nbnd, IMAGE::nlin, IMAGE::npix, PERIODOGRAM, Prog\-Meter\_\-Create, Prog\-Meter\_\-Destroy, Prog\-Meter\_\-Update, RELMEM, rnd, SLEN, and value.