\section{contnorm.c File Reference}
\label{contnorm_8c}\index{contnorm.c@{contnorm.c}}
{\tt \#include \char`\"{}sadie.h\char`\"{}}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
void {\bf CONTNORM} ({\bf IMAGE} $\ast$in, {\bf PIXEL} mean, double sigma, short inc, {\bf IMAGE} $\ast$$\ast${\bf out})
\end{CompactItemize}


\subsection{Function Documentation}
\index{contnorm.c@{contnorm.c}!CONTNORM@{CONTNORM}}
\index{CONTNORM@{CONTNORM}!contnorm.c@{contnorm.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}void CONTNORM ({\bf IMAGE} $\ast$ {\em in}, {\bf PIXEL} {\em mean}, double {\em sigma}, short {\em inc}, {\bf IMAGE} $\ast$$\ast$ {\em out})}\label{contnorm_8c_a0}




Definition at line 14 of file contnorm.c.

References CHECKIMG, IMAGE::data, GETMEM, MESSAGE, IMAGE::nbnd, IMAGE::nlin, IMAGE::npix, out, SLEN, T\_\-CONTNORM, T\_\-EXIT, IMAGE::text, and TIMING.