\section{checker.c File Reference}
\label{checker_8c}\index{checker.c@{checker.c}}
{\tt \#include \char`\"{}sadie.h\char`\"{}}\par
\subsection*{Functions}
\begin{CompactItemize}
\item 
void {\bf CHECKER} (short nlin, short npix, short jsize, short ksize, {\bf IMAGE} $\ast$$\ast${\bf out})
\end{CompactItemize}


\subsection{Function Documentation}
\index{checker.c@{checker.c}!CHECKER@{CHECKER}}
\index{CHECKER@{CHECKER}!checker.c@{checker.c}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}void CHECKER (short {\em nlin}, short {\em npix}, short {\em jsize}, short {\em ksize}, {\bf IMAGE} $\ast$$\ast$ {\em out})}\label{checker_8c_a0}




Definition at line 15 of file checker.c.

References CHECKIMG, GETMEM, MESSAGE, out, SLEN, SMAX, SMIN, T\_\-CHECKER, T\_\-EXIT, and TIMING.